Fairytale bookmark ΙΙ

Polymer clay bookmark with decorative tassel.
Flexible and safe despite the low thicknes.
Stamped quote: “Some day you will be old enough to start reading fairy tales again” by C.S. Lewis.
Bookmark length: approximately 14 cm (5,5”)
Tassel: 6 cm (2,3″)
Overall length with the tassel extended: 27 cm – 10,6″.

Σελιδοδείκτης με σταμπωτό κείμενο και διακοσμητική φούντα.
Φτιαγμένος εξ ολοκλήρου στο χέρι από πολυμερή πηλό, με ελαστικότητα και αντοχή παρά το μικρό πάχος.
Μήκος σελιδοδείκτη: 14 εκ.
Μήκος φούντας: 6 εκ.
Συνολικό μήκος: περίπου 27 εκ.